Logiweb bibliography of base

Up Help

[0] base

The pyk compiler, version 0.grue.20050502+ by Klaus Grue GRD-2005-06-02.UTC:08:38:28.861822 = MJD-53523.TAI:08:39:00.861822 = LGT-4624418340861822e-6