Logiweb bibliography of base

Up Help

[0] base

The pyk compiler, version 0.grue.20060417+ by Klaus Grue GRD-2006-06-06.UTC:07:08:08.884890 = MJD-53892.TAI:07:08:41.884890 = LGT-4656294521884890e-6